M! Exit SuperSonic
M" Turn mixer power on/off
M# Move display up one device
M$ Move display down one device
M& Remove device and place it at bottom of device list
M' Mute audio output
M(*Used to toggle an audio function distinct to your sound board
M+ Current PC speaker volume input
M, Used to select PC speaker volume input
MnpUsed to select PC speaker volume input
M- Activate this button before selecting desired settings to Load
M. Activate this button before selecting desired settings to Save to
M/6Select the desired letter you wish to Load, Save, or Del settings from/to
M7 Current main volume output
M8;Used to select main volume output
M< Current compact disc volume input
M=@Used to select compact disc volume input
MA Current external volume input
MBEUsed to select external volume input
MF Current microphone volume input
MGJUsed to select microphone volume input
MK Current bass level
MLOUsed to select bass level
MP Current treble level
MQTUsed to select treble level
MU Current left/right audio channel output balance
MVYUsed to select left/right audio channel output balance
MZ Activate this button before selecting desired settings to Delete
M[^Select the desired letter you wish to Load, Save, or Del settings from/to
M_ Current digital (sampled data) volume output
M`cUsed to select digital (sampled data) volume output
Md Current recording level of input sources
MehUsed to select recording level of input sources
Mi Toggle compact disc input on/off
Mj Toggle external input on/off
Mk Toggle microphone input on/off
Ml Left audio channel recording meter
Mm Right audio channel recording meter
C! Exit SuperSonic
C" Turn compact disc power on/off
C# Move display up one device
C$ Move display down one device
C& Remove device and place it at bottom of device list
C' Title of compact disc in CD-ROM drive. [Unknown] indicates that the disc hasn't been catalogged yet.
C( This window displays the track names of the compact disc in the CD-ROM drive. You may point and click inside this window to select a track.
C),Use this slider to scroll track list up and down.
C1 Activate this button for shuffle play. When a track has finished playing, the next track, picked from random, will begin playing.
C2 Activate this button for continuous play. When a track has finished playing, the next track will begin playing.
C3 Activate this button to preview a little of each track. Deactivate this button to discontinue preview mode.
C4 Activate this button for repeat play. After the current track has finished playing, it will be repeated.
C5 Activate this button to pause compact disc playing. Deactivate this button to resume play.
C6 Press this button to eject compact disc or to close disc tray.
C7 Press this button to stop compact disc playing.
C8 Press this button to activate compact disc play at the selected track and at the specified elapsed track time.
C9 Press this button during play to reset playing from the start of the current track.
C: Press this button during play to reset playing from the end of the current track.
C;>This slider reflects the total elapsed time from the start of the CD in the format minutes, seconds, 100ths.
C?BThis slider reflects the total elapsed time from the start of the current track in the format minutes, seconds, 100ths.
C/ This display reflects the total elapsed time from the start of the CD in the format minutes, seconds, 100ths.
C0 This display reflects the total elapsed time from the start of the current track in the format minutes, seconds, 100ths.
C- This display reflects the total compact disc play time in the format minutes, seconds, 100ths.
C. This display reflects the total track play time, of the selected track, in the format minutes, seconds, 100ths.
CC Select previous cd-rom drive
CD Select next cd-rom drive
CE Current cd-rom volume output level
CFIUsed to select cd-rom volume output level
A! Exit SuperSonic
A" Turn sample player power on/off
A# Move display up one device
A$ Move display down one device
A& Remove device and place it at bottom of device list
A' This is the current sample file or the current directory. You may click inside this window to type in a sample file name. This is useful when you want to record into a new sample file.
A( This is a list of samples in the current directory. You may click inside this window to select a sample or change the current drive and/or directory.
A),Use this slider to scroll sample list up and down.
A- This is the selected sample file's sample rate in hertz.
A. This is the sample rate in which the selected sample will be played or recorded at in hertz.
A/ This display reflects the total sample play time, of the selected sample, in the format minutes, seconds, 100ths.
A0 This display reflects the total elapsed time from the start of the selected sample in the format minutes, seconds, 100ths.
A1 Activate this button for shuffle play. When a sample has finished playing, the next sample, picked from random, will begin playing.
A2 Activate this button for continuous play. When a sample has finished playing, the next sample will begin playing.
A3 Activate this button to preview a little of each sample. Deactivate this button to discontinue preview mode.
A4 Activate this button for repeat play. After the selected area of the current sample has finished playing, it will be repeated.
A5 Activate this button to pause sample play or record. Deactivate this button to resume play or record.
A6 Press this button to record into the selected area. If no area selected, recording will begin at the current elapsed time.
A7 Press this button to stop sample play or record.
A8 Press this button to play the selected area of the selected sample. If no area selected, play will begin at the current elapsed time.
A9 Press this button during play to reset playing from the start of the current sample.
A: Press this button during play to reset playing from the end of the current sample.
A;>Use this slider to change the sample rate in which the selected sample will be played or recorded at.
A?BUse this slider to change the current elapsed time from the start of the selected sample.
AC Activate this button to indicate recording should be done in mono.
AD Activate this button to indicate recording should be done in stereo.
AE Activate this button to indicate recording should be 8-bit.
AF Activate this button to indicate recording should be 16-bit.
AG Activate this button to play one of the samples assigned to the A-L buttons.
AH Activate this button to assign the current sample to one of the A-L buttons.
AI Activate this button to remove the assigned sample from one of the A-L buttons.
AJUSelect the desired letter you wish to Play, Save, or Delete a sample from/to.
AV After selecting a sample, press this button to permanently delete it.
AW After selecting a sample, press this button to copy it. When prompted, type in the new name and press Enter.
E! Exit SuperSonic
E" Turn sample editor power on/off
E# Move display up one device
E$ Move display down one device
E& Remove device and place it at bottom of device list
E' This window displays the effect's name that you're currently working with.
E( This is a list of effects which can be applied to the current sample. You may click inside this window to select an effect you wish to apply.
E),Use this slider to scroll sample effects and sample effect options up and down.
E- This is a waveform representing the left audio channel of the current sample. You may click and drag inside this window to select a specific area to edit, play, or record into.
E. This is the amount of time selected within the sample, starting from the sample player's elapsed time, in the format minutes, seconds, 100ths.
E/2Use this slider to change the time selected within the sample, starting from the sample player's elapsed time.
E3 Press this button when lit to undo the last edit or sample effect operation.
E4 Press this button to quickly select the entire sample.
E5 Press this button to delete area selected and place it in the clipboard.
E6 Press this button to copy area selected and place it in the clipboard.
E7 Press this button when lit to replace the area selected with the data in the clipboard.
E8 Press this button when lit to mix audio in the clipboard with that of the selected area.
E9 Activate this button to select and include the left channel for sample play and sample edit operations.
E: Activate this button to select and include the right channel for sample play and sample edit operations.
E; Activate this button to select dot representation of waveform.
E< Activate this button to select line representation of waveform.
E= This is a waveform representing the right audio channel of the current sample. You may click and drag inside this window to select a specific area to edit, play, or record into.
E> Press this button to delete all audio data not selected and place it in the clipboard.
E? Activate this button to select bar representation of waveform.
S! Exit SuperSonic
S" Turn spectrum analyzer power on/off
S# Move display up one device
S$ Move display down one device
S& Remove device and place it at bottom of device list
S' Left audio channel spectrum display
S( Right audio channel spectrum display
S) Activate this button to have the alternate color applied to the peak brick of each band.
S* Activate this button to have the alternate color applied to bricks in the upper half of the display.
S+ Activate this button to have all colors between the specified base and alternate color faded vertically among the bricks.
S, Activate this button to have each color between the specified base and alternate color cycled through the entire display.
S- Activate this button to have display updated less frequently.
S. Activate this button to pause display.
S/ This is the base color number used for spectrum display and effects.
S03Use this slider to change the base color number used for spectrum display and effects.
S4 This is the alternate color number used for spectrum display and effects.
S58Use this slider to change the alternate color number used for spectrum display and effects.
S9 This is the gravity level applied to the stacks of bricks.
S:=Use this slider to change the gravity level applied to the stacks of bricks.
S>AUse this slider to change the distance between bricks.
SBEUse this slider to change the distance between bands.
SF This is the gravity level applied to the peak bricks.
SGJUse this slider to change the gravity level applied to the peak bricks.
P! Exit SuperSonic
P" Turn wave analyzer power on/off
P# Move display up one device
P$ Move display down one device
P& Remove device and place it at bottom of device list
P' Left audio channel waveform display
P( Right audio channel waveform display
P) Activate this button to have the alternate color applied to the entire display when a waveform reaches the top or bottom of display.
P* Activate this button to have the alternate color applied to the upper half of the display.
P+ Activate this button to have all colors between the specified base and alternate color faded vertically among the display.
P, Activate this button to have each color between the specified base and alternate color cycled through the entire display.
P- Activate this button to have display updated less frequently.
P. Activate this button to pause display.
P/ This is the base color number used for waveform display and effects.
P03Use this slider to change the base color number used for waveform display and effects.
P4 This is the alternate color number used for waveform display and effects.
P58Use this slider to change the alternate color number used for waveform display and effects.
P9 This is the number of waveforms permitted on display at one time.
P:=Use this slider to change the number of waveforms permitted on display at one time.
W! Exit SuperSonic
W" Turn peak analyzer power on/off
W# Move display up one device
W$ Move display down one device
W& Remove device and place it at bottom of device list
W' Left audio channel peak display
W( Right audio channel peak display
W) Activate this button to have display travel up.
W* Activate this button to have display travel down.
W+ Activate this button to have all colors between the specified base and alternate color faded vertically inside each graph.
W, Activate this button to have each color between the specified base and alternate color cycled through the entire display.
W- Activate this button to have display updated less frequently.
W. Activate this button to pause display.
W/ This is the base color number used for peak display and effects.
W03Use this slider to change the base color number used for peak display and effects.
W4 This is the alternate color number used for peak display and effects.
W58Use this slider to change the alternate color number used for peak display and effects.
W9 This is the gravity level applied to the peaks of each graph.
W:=Use this slider to change the gravity level applied to the peaks of each graph.
W>AUse this slider to change the vertical distance between graphs.
WBEUse this slider to change the maximum vertical distance allowed to graph each peak.
T! Exit SuperSonic
T" Turn tuner power on/off
T# Move display up one device
T$ Move display down one device
T& Remove device and place it at bottom of device list
T' Increase tuner volume
T( Decrease tuner volume
T) Mute tuner volume
T* Activate this button to preview a little of each station memory. Deactivate this button to discontinue preview mode.
T+ Activate this button to seek for a radio station from the current radio frequency. Deactivate to abort seek.
T- This is the current radio frequency tuned to and the current time. A music note symbol will appear when a station is tuned in.
T.1Use this slider to change the radio frequency tuned to. A music note symbol will appear when a station is tuned in.
T2 Activate this button and then press the station memory (1-10) which you would like to save the current station to.
T3 Activate this button and then press the station memory (1-10) you wish to delete.
T4=Radio station memories
T> Activate this button before selecting desired memories to load (A-L).
T? Activate this button before selecting desired memories button to save to (A-L).
T@ Activate this button before selecting desired memories to delete (A-L).
TALSelect the desired letter you wish to Load, Save, or Delete the current memories from/to.
TM Time to start recording
TNQUse this slider to select the time you wish recording to start.
TR Time to stop recording
TSVUse this slider to select the time you wish recording to stop.
D! Exit SuperSonic
D" Turn disc jockey power on/off
D# Move display up one device
D$ Move display down one device
D& Remove device and place it at bottom of device list
D' Resources window title
D( Resources available for constructing queue
D),Use this slider to scroll window up and down.
D- Total time currently in the queue
D. List of items queue'd for activation
D/2Use this slider to scroll queue window up and down.
D3 Active queue item
D4 Press this button when lit to add the selected resource item into the queue.
D5 Press this button when lit to insert the selected resource item into the queue before the selected queue item.
D6 Press this button when lit to delete the selected queue item.
D7 Press this button when lit to clear or delete all queue items.
D8 Activate this button to pause queue.
D9 Press this button to activate the next queue item immediately.
D< This display reflects the selected queue item's prestart in the format hours, minutes, seconds, 100ths.
D=@Use this slider to change the selected queue item's prestart in the format hours, minutes, seconds, 100ths.
DA Current clock time in 24 hour format hours, minutes, seconds, 100ths
DB Time remaining for the active item in the format hours, minutes, seconds, 100ths.
DC This display reflects the selected queue item's length in the format hours, minutes, seconds, 100ths.
I! Exit SuperSonic
I" Turn DJ manual switcher power on/off
I# Move display up one device
I$ Move display down one device
I& Remove device and place it at bottom of device list
I' Available switches
I(+Use this slider to scroll switch window up and down.
I, Press this button to enable and/or control the currently selected switch.
I- Press the slider button to enable and/or control the currently selected switch.
I. This display reflects the currently selected switch's length in the format minutes, seconds, 100ths.
I/2Use this slider to change the currently selected switch's length in the format minutes, seconds, 100ths.
I3 Activate this button before selecting desired switch settings to Load.
I4 Activate this button before selecting desired switch settings to Save to.
I5 Activate this button before selecting desired switch settings to Delete.
I6ASelect the desired letter you wish to Load, Save, or Delete switch settings from/to.
K! Exit SuperSonic
K" Turn clock power on/off
K# Move display up one device
K$ Move display down one device
K& Remove device and place it at bottom of device list
K' Current clock time in 24 hour format hours, minutes, seconds, 100ths
K(+Use this slider to change current clock time.
K, Activate this button to change current clock time.
K. Current clock date
K/0Use these arrow buttons to increment/decrement the day of month.
K1 Use this slider button to change the year.
K2 Click to the left or right of the slider button to change the month.
K3 Activate this button to change current clock date.
K4 Time remaining for the active DJ queue item in the format hours, minutes, seconds, 100ths.
K5 Chronograph elapsed time in the format hours, minutes, seconds, 100ths.
K6 Activate this button to enable chronograph.
K7 Press this button to zero chronograph.
